新利18

??
Jiangxi Synergy Pharmaceutical Co., Ltd.
  • ????
  • ?? ??
  • ?? ??
  • ?? ??
  • ??
  • ?? ???
  • ??
    • ?
    Products

    ??:??? ??? ?? ????
    ??:+86-795- 4605771,4605608??
    ??:+86-795-4605772
    ??:info@cyqclp.cn?????????????
    ??:330700?

    ??

     

    		 ?? CAS No. ??
    ???? 60142-96-3

    CEP 2011-264-Rev00
    EDMF registered in 11 EU countries
    US-DMF 25825
    CAN-DMF 2007-254
    Korea KDMF No: 20120831-142-1-75-05
    ????? 90098-04-7

    Japan PMDA GMP Certification
    Korea KDMF No: 20070504- 4-B-240-14
    US-DMF 21700
    ????HCL 99300-78- 4

    Chinese SFDA GMP Certification
    DMF-CTD AVAILABLE
    ??????? 89796-99-6

    US-DMF 24210
    ???? ???? 145040-37-5

    US-DMF 23649
    J-DMF 224MF10057
    CEP application No.: 2013-007
    ???? 144701-48-4

    144701-48-4
    ????? 169590-42-5

    US-DMF25582
    CAN-DMF 2011-201
    CEP application No.: 2012-404
    ???? 58066-85-6

    8 Records


    【网站地图】【sitemap】