新利18

Edition
Jiangxi Synergy Pharmaceutical Co., Ltd.
  • Home
  • About us
  • Products
  • Facilities
  • R & D
  • QC/QA
  • Jobs
    		•
    Products

    Headquarter:

    Add: Jiangxi Fengxin Industrial Park, Fengxin,Jiangxi,P.R.China

    Tel: +86-795-4605771,4605608

    Fax: +86-795-4605772

    E-mail: info@cyqclp.cn

    Post Code: 330700

    Sales Center:

    Room 1901, Tower A, Yuanshen Financial Building, NO. 355 Yuanshen Road, Pudong New Area, Shanghai China

    Tel:+86-21-62886322

    E-mail: sales@cyqclp.cn

    Post Code: 200135

    QC/QA

    We have individual QA unit and QC unit, according to GMP requirement under the guideline of ICH Q7. Our QC test center covers 1500m2, including quality and chemical analytical lab, instrument analytical lab and microbial test lab. Many precious analytical instruments such as NMR, XRD, LC/MS, GC/MS, MALVERN Mastersizer2000, SEM, HPLC, and GC. etc are all well-equipped.

    A complete documentation system for all kinds of SOPs is on site, and quality management regulations such as change control, deviation management, validation, calibration, self-inspection and quality review are strictly performed. From process design, material purchase, production, test and release to after-sale service, we practice overall process control, so as to ensure stable and high quality.

    Our company accepts customer quality audits more than 50 times a year, and has been tested by national officials such as NMPA, US-FDA, PMDA, MFDS for on-site quality inspections for several times; up to now, we have successfully obtained a number of certificates including GMP, USFDA-EIR LETTER, CEP, EU-GMP and so on. 

     

    8 Records

    【网站地图】【sitemap】