新利18



  • Edition
    Jiangxi Synergy Pharmaceutical Co., Ltd.
  • Home
  • About us
  • Products
  • Facilities
  • R & D
  • QC/QA
  • Jobs
    		•
    Products

    Headquarter:

    Add: Jiangxi Fengxin Industrial Park, Fengxin,Jiangxi,P.R.China

    Tel: +86-795-4605771,4605608

    Fax: +86-795-4605772

    E-mail: info@cyqclp.cn

    Post Code: 330700

    Sales Center:

    Room 1901, Tower A, Yuanshen Financial Building, NO. 355 Yuanshen Road, Pudong New Area, Shanghai China

    Tel:+86-21-62886322

    E-mail: sales@cyqclp.cn

    Post Code: 200135

    CMO Services
    Production Capacity
    GMP
    Regulatory

    R&D

    (process optimization- scale up production)
    EHS
    Based on our excellent GMP, EHS and regulatory registration system in line with international standards, building up a CMO platform with integrate advantageous resources and achieves a good and high-effective system integrating R&D, compliant production and registration.
    Laboratory process transfer and process optimization
    Provide pilot scale-up / process validation / GMP commercial production
    CMO product stability study / quality research support
    Domestic / foreign registration documents preparation
    Acceptable for domestic / foreign authority’s and customer’s audit
    CMO projects for products with OEB class 1/2/3
    Coordinated development of CMO/ CDMO projects with our existing API business
    Integrate R & D resources, expand CMO / CDMO business, make use of the accumulated ability to develop high-purity products for many years, provide solutions for low-cost with high-quality products, and actively carry out more project cooperation with originators and top generic companies.
    【网站地图】【sitemap】